XMM-Newton CCF Release Note

XMM-CCF-REL-33

RGS CCD Darkframe

C. Erd

October 31, 2000

1 CCF components

Name of CCF VALDATE List of Blocks changed

CAL VERSION XSCS flag

RGS1 DARKFRAME 0004 1998-01-01T00:00:00 DARKFRAME — NO RGS2 DARKFRAME 0004 1998-01-01T00:00:00 DARKFRAME — NO

2 Changes

The column A_2 did not have a proper Hex zero value. This caused problems when reading with the SAS/DAL (SPR 1671). The identical values as issue 3 were uploaded, with this problem fixed.

3 Scientific Impact of this Update

None.

4 Estimated Scientific Quality

See comments with previous release.