XMM-Newton CCF Release Note

XMM-CCF-REL-13

RGS GTI Selection

C. Erd

October 4, 2000

1 CCF components

Name of CCF VALDATE List of Blocks changed

CAL VERSION XSCS flag

RGS1 HKPARMINT 0004 1999-01-01T00:00:00 HKPARMINT, TRANSLATION, AUXPAR

— NO

RGS2 HKPARMINT 0004 1999-01-01T00:00:00 HKPARMINT, TRANSLATION, AUXPAR

— NO

2 Changes

The selections are based on a copy of the soft limits specified in the operational data base version 2.5

3 Scientific Impact of this Update

First release.

4 Estimated Scientific Quality

For the time being rather loose criteria for data rejection are being defined, until more experience is gained and more stringent filters are required. These criteria will only perform very basic sanity checks, and it is not expected that the GTI will be significantly reduced.