XMM-Newton CCF Release Note

XMM-CCF-REL-7

EPIC Modes

D Lumb

September 8, 2000

1 CCF components

Name of CCF VALDATE List of Blocks changed

CAL VERSION XSCS flag

EMOS1 MODEPARAM 0005 2000-01-01T00:00:00 MODEPARAM YES EMOS2 MODEPARAM 0005 2000-01-01T00:00:00 MODEPARAM YES EPN MODEPARAM 0003 2000-01-01T00:00:00 MODEPARAM YES

2 Changes

First release

The file MODEPARAM allows to correct for factors such as the effective livetime per readout mode, out of time event fractions etc., which are used to correct the EXPOSURE times. The times are derived from the accurate clock sequence definitions, and thus determined by “dead-reckoning”.

3 Scientific Impact of this Update

4 Estimated Scientific Quality

Any imprecision in mode-dependent EXPOSURE corrections are expected to be small compared with the know deficiencies in effective area determination of CCDs and mirror.